Logging out and in to VELA

Sometimes there is some communication problem between VELA and the TCS and this can sometimes be solved by:

1. put the brakes in local 2. hit ctrl-c in the TCS window 3. logout from ANTLIA 4. logout from VELA (click on button Exit ) 5. login again to VELA using the same user 6. start TCS 7. check if things are working and if so • reconnect the receivers ( Connect ) • reselect lines ( Lines ) • reselect observation mode ( Obsmode ) • insert the pointing offsets manually with Point 8. start the observations again If this doesn’t work try the steps in Section ⁀”How to reset ICCABIN and ANTLIA”