No communication with SCORPIUS

Sometimes when the observer aborts an integration and for other unspecified reasons the link to SCORPIUS can go down. In this case do the simple solution is:

1. Click on Shell and select Location: Scorpius and click on Accept. It is also possible to open a local shell on VELA and telnet to SCORPIUS (telnet scorpius).

2. login with user restart and give the guest password or do a ctrl-alt-del directly on SCORPIUS. This should only be used if the first method didn’t work.

3. wait for more than 60 seconds. There is no message telling you when SCORPIUS has completed the reboot so just keep an eye on the clock.